Be

Si

Scint

This work - silicon detector This work - current integration

energy (keV)

NIBF

Drescher Si Drescher Be Neubert Be Geant4 Penelope

0 0.025

0.05

0.075 0.1 0.125

0.15

0.175 0.2 0.225

0 20 40 60 80 100 120 140